CREATE TABLE `multicharacter_slots` (
	`identifier` VARCHAR(60) NOT NULL DEFAULT '' COLLATE 'utf8mb4_unicode_ci',
	`slots` INT(11) NOT NULL DEFAULT '1'
)
COLLATE='utf8mb4_unicode_ci'
ENGINE=InnoDB
;
